Symbol

Wave D0:A0:v(cout7) D0:A0:v(cin) D0:A0:v(sum7)

Voltages (lin)

-400m

-200m 0 200m

400m

600m

800m 1 1.2 1.4 1.6 1.8 2 2.2 2.4 2.6 2.8 3 3.2 3.4 3.6 3.8 4 4.2 4.4 4.6 4.8 5 5.2

Time (lin) (TIME)

0 500p 1n 1.5n 2n 2.5n 3n 3.5n 4n 4.5n 5n

* hspice file created from add.ext - technology: scmos

18:08:24 CST, 12/19/1999