controller Tue Dec 8 11:07:05 1998

time (ns)

0.0 2500.0 5000.0 7500.0 10000.0 12500.0 15000.0 17500.0 20000.0 22500.0 25000.0 27500.0

clka clkabar

clkb clkbbar RUN RESTART OP STATE CLRPC INCPC WRPC

RDMEM WRMEM

ADDRCTRL

WRIR0 WRIR1 ENAND ENOR ENINV

ENBARREL

ENADD

ENMEMLD

ENMEMST

ENBR WRWB WRREG

0000 0001 0010 0011 0100 0101 0110 0111 1000 1001 1010 1011 1100 1101 1110 1111 0001 0010 1101 0011 1110 1111 XX 00 101101101101101101101101101101101101101101101101101101101101101101 1011011011011011011011011011 00 1011011011011011011011 00